\hypertarget{namespacejymlp_1_1errt}{
\section{jymlp::errt Namespace Reference}
\label{namespacejymlp_1_1errt}\index{jymlp::errt@{jymlp::errt}}
}


The error function type.  
\subsection*{Enumerations}
\begin{DoxyCompactItemize}
\item 
enum {\bfseries ErrT} \{ {\bfseries Unset} =  0, 
{\bfseries q2a2} =  1, 
{\bfseries q2a1} =  2, 
{\bfseries q1a1} =  3
 \}
\end{DoxyCompactItemize}


\subsection{Detailed Description}
The error function type. q2a2 corresponds to computing mean squared error (MSE), q2a1 to computing mean euclidean vector norm error (MEE), and q1a1 to computing mean absolute error (MAE). 